VERSION 1.0 CLASS
BEGIN
  MultiUse = -1  'True
END
Attribute VB_Name = "SmallBusiness3"
Attribute VB_GlobalNameSpace = False
Attribute VB_Creatable = False
Attribute VB_PredeclaredId = False
Attribute VB_Exposed = False
Option Explicit
' >> Best viewed in Full Module view. <<
'
' Storage for debug ID number.
Private mlngDebugID As Long
Implements IDebug

' The private Employees collection holds
'   the Employee objects.
Private emps As New Employees

' Rather than declaring a variable Public
'   Employees As New Employees, it's better
'   coding practice to make the collection
'   private, and create a read-only
'   property to return the Employees
'   collection.  This way, the collection
'   can't get accidentally released by
'   setting the public variable to
'   Nothing.
Public Property Get Employees() As Employees
    Set Employees = emps
End Property

Private Sub Class_Initialize()
    mlngDebugID = DebugInit(Me)
End Sub

Private Sub Class_Terminate()
    DebugTerm Me
End Sub

' -------- IDebug Implementation --------
'
' IDebug.DebugID gives you a way to tell
' ====== -------    objects apart.  It's
'   required by the DebugInit, DebugTerm,
'   and DebugShow debugging procedures
'   declared in modFriend.
'
Private Property Get IDebug_DebugID() As Long
    IDebug_DebugID = mlngDebugID
End Property


